You may select any of these drivers for use with your matrix printer
provided that the driver is 100% compatible with the printer. To select a
driver from the list, use the up and down arrow keys on the key pad to
highlight the desired driver, then press F1 to continue.

The page width may be modified by the user.  Use the right arrow key to move
to the page width column.  The values are expressed in thousands of an inch.
For example, 8.0 inches would be entered as 8000.

Those drivers with an *(asterisk) are 9 pin drivers for 24 pin printers.
